longit energy profile (% of E inc)

Fe e- 30 GeV G4-G3-Egs4 comparison

0

2

4

6

8

10

12

0 2 4 6 8 10 12 14 16 18 20

G4 G3 Egs4

L/Radl

(1/E0)(dE/dRadl)

0

2

4

6

8

cumul longit energy dep (% of E inc) 0

20

40

60

80

100

2 4 6 8 10 12 14 16 18 20

G4 G3 Egs4

L/Radl

Ecumul/E0

0 radial energy profile (% of E inc)

Fe e- 30 GeV G4-G3-Egs4 comparison

1

10

10^2

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

G4 G3

R/Radl

(1/E0)(dE/dRadl)

1

cumul radial energy dep (% of E inc) 0

20

40

60

80

100

0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

G4 G3

R/Radl

Ecumul/E0

0