Pb-Fe-Si e- 6 8 10 12 GeV 100 evts

25 30 35 40 45 50 55 60 65

6 7 8 9 10 11 12 E (GeV)

Evis (MeV)

G3 G4 data

20

25

30

35

40

45

6 7 8 9 10 11 12 E (GeV)

Evis (MeV)

G3 G4 data