end point - z(mm)

100 MeV e- in aluminium, en.loss + msc only

0 1000

2000

3000

4000

5000

6000

7000

-40 -20 0 20 40 60 80 100 120 140

G4 : step limit 10 mm G4 : step limit 1 mm

end point - r(mm) 0 500 1000

1500

2000

2500

3000

3500

4000

0 10 20 30 40 50 60 70 80 90 100

G4 : step limit 10 mm G4 : step limit 1 mm

mm