total energy deposit in C6F6 (MeV)

C6F6 Gamma 9 MeV G4-G3 comparison

10

10^2

10^3

10^4

10^5

0 1 2 3 4 5 6 7 8 9 10

ID Entries Mean RMS

1 100000 0.9570 2.317 G4 G3

MeV evts